Telangana: Fire breaks out at boys hostel in Hyderabad, none hurt

Hyderabad (Telangana) [India], October 21 (ANI): A massive fire broke out at a boys' hostel in Telangana Hyderabad at 6:40 p.m. on Friday evening.
There were no casualties reported in the incident.
The fire broke out at Srinivasa Boys Hostel under Narayanaguda PS limits in Hyderabad at 6:40 pm yesterday, Narayanaguda Police said.
Huge flames could be seen coming from the building.
A fire brigade was called to douse the fire and the fire was brought under control after an hour or so.
Around 15-20 people were present in the hostel during the time of the incident.
There were no casualties reported. The fire has been brought under control, officials said.
More details are awaited. (ANI)